\mainbaselineskip=13.4pt
\def\normalsize{\elevenpt\baselineskip\mainbaselineskip
   \normalbaselineskip\mainbaselineskip}
\let\large\twelvept
\let\Large\fourteenpt
\let\LARGE\seventeenpt
\let\huge\twentypt
\let\small\tenpt
\let\footnotesize\ninept
\let\scriptsize\eightpt
\let\scriptscriptsize\sixpt



