0.3

0.35

0.4

0.45

0.5

0.55

0.6

0.65

0.7

0.75

0.8

0.85

0.9

0.95

1

t =0

t =1

t =2

t =3

t =4

t =5

t =5.5

0.6

0.65

0.7

0.75

0.8

0.85

0.9

0.95

1

0.3 0.4 0.5 0.6 0.7 t =5

t =5.1

t =5.2

t =5.3

t =5.4

t =5.5

0.3

0.35

0.4

0.45

0.5

0.55

0.6

0.65

0.7

0.75

0.8

0.85

0.9

0.95

1

t =0

t =1

t =2

t =3

t =4

t =4.5

0.55

0.6

0.65

0.7

0.75

0.8

0.85

0.9

0.95

0.3 0.4 0.5 0.6 0.7 t =4

t =4.1

t =4.2

t =4.3

t =4.4

t =4.5

0.3

0.35

0.4

0.45

0.5

0.55

0.6

0.65

0.7

0.75

0.8

0.85

0.9

0.95

1

t =0

t =1

t =2

t =2.3

0.5

0.52

0.54

0.56

0.58

0.6

0.62

0.64

0.66

0.68

0.7

0.72

0.74

0.76

0.78

0.8

0.35 0.4 0.45 0.5 0.55 0.6 0.65 t =1.9

t =2.

t =2.1

t =2.2

t =2.3